!(

!(

!(

!(

-10°

0°

0°

10°

10°

40°

50°

50° -10°

40°

Lothar

Martin

Millions of m3 of windthrown timber 0 - 1 1 - 5 5 - 10 10 - 20 20 - 50

# #

Paris

Lyon

Marseille

Munich

0 200 400 100 Km