-20°

-30°

-40°

-50°

-10° 0°

0°

10° 20°

20°

30°

40°

40° 50°

60°

60°

70° 80° 90° 100°

40°

40° 50°

50°

60°

30°

-20°

-30°

-40° 90°

100°

30° 30°

Water exploitation index per country, %

> 20 10 - 20 5 - 10 < 5 No data Outside data coverage