-10°

-20°

-30°

0°

0°

10°

10° 20°

20°

30°

30°

40°

40°

50° 60° 70°

40°

40°

50°

50°

60°

Changes in water availability

-25 to -10 -10 to -5 -5 to + 5 + 5 to + 10

(% )

Outside data coverage

< -25

> + 10