-10°

-20°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

20°

20°

30°

30°

40°

40°

-10°

50° 50°

Vegetation sensitivity index

No data

0 - 1.0 1.0 - 1.5 1.5 - 2.0

Outside study area