-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40°

40°

50° 60° 70°

40° 40°

50° 50°

60°

60°

-10°

-30°

50°

60°

Herbicide consumption per agricultural land area unit

Kg/ha 0 - 0.5 0.5 - 1.0 1.0 - 1.5 1.5 - 2.0 > 2.0 No data Outside data coverage