-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

30°

30°

40°

40°

50°

50°

60°

60°

Se d im e n t Disch a rge s

Total Suspended Solids

Sedim ent flow stations