-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

40°

40°

50°

50°

60°

60°

-10°

-30° 50°

% of population exposed

100 %

0 %

Data delivered

O3

No data Outside data coverage

PM10

NO2