#S #S

#S #S #S #S #S

#S #S

#S

#S

#S#S

#S#S #S

#S #S #S

#S #S

#S

#S #S #S#S

#S #S #S

#S

#S

#S #S #S #S #S #S #S

#S#S #S #S #S #S #S#S#S #S#S #S #S #S #S #S #S #S #S #S #S #S #S #S#S #S

#S #S #S

#S

#S #S#S

#S

#S #S #S #S #S #S #S

#S #S

#S #S #S

#S

#S #S

#S

#S

#S

#S #S #S

#S

#S

#S #S #S #S #S

#S

#S#S #S

#S #S #S #S

#S

#S

#S

#S #S

#S

#S

#S

#S #S

#S

#S

#S #S

#S

#S #S #S #S

#S

#S #S #S #S #S

#S

#S #S #S

#S

#S

#S

#S

#S

#S

#S

#S #S#S

#S #S #S# S #S #S #S#S #S #S#S #S #S

#S

#S

#S #S #S

#S

#S

#S

#S

#S

#S #S

#S

#S #S #S #S #S #S #S #S #S #S #S #S #S #S #S #S #S #S

#S#S

#S#S

#S#S#S

#S #S #S

#S #S #S #S #S #S #S #S #S #S #S

#S #S

#S #S #S

#S #S

#S #S #S

#S

#S #S

#S

#S #S #S #S #S

#S #S #S #S #S #S #S #S

#S

#S #S #S #S #S#S

#S

#S

#S #S

#S

#S #S

#S

#S #S

#S

#S

#S

#S

#S

#S #S

#S #S

#S

#S#S

#S

#S

#S

#S

#S #S #S #S

#S #S #S

#S

Ozone

MAX 26 Rural Stations #S

<= LCL #S > LCL and <= UCL #S > UCL and <= LV #S > LV and <= 50 % above LV #S > 50 % above LV