!(

!( !(

!(

!(!(

!( !(

!( !( !( !( !( !( !(

!(

!( !( !(

!(

!( !( !(!(

!(

!( !( !(

!(

!(!( !( !( !(

!( !(

!(

!(!(!(

!(!( !(

!(!(

!(

!(!( !(

!(

!( !(

!( !(

!(

!( !(

!(

!(

!(

!(

!(

!(

!(

!( !(

!(

!(!( !( !( !( !( !( !( !( !(

!(

!( !( !(

!(!(!(!( !( !( !( !(

!(

!(

!( !( !( !(

!(

!(

!(

!(

!( !( !(

!( !( !(

!( !( !( !(

!(

!(

!(

!( !(

!(

!( !(

!(!(

!(

!(

!(

!(

!(

!(

!(

!(

!(

!(

-10°

-20°

-30°

-40°

-50°

0°

0°

10°

10°

20°

30°

30°

40°

40°

50°

50°

60° 70° 80° 90°

40° 40°

50°

50°

60°

60°

-10°

-30°

-40°

-50°

60°

70°

80°

30°

Nuclear production capacity, 2001

Nuclear percentage of energy production, 2002

!( !( !( !( >4000 !( 3000 - 4000 !( !( 2000 - 3000

!( 1000 - 2000

!( <1000

Shut down

Operable

No production

Outside data coverage

20 - 40

0 - 20

40 - 60 60 - 80