#S #S #S #S

#S

#S

#S

#S

#S

#S #S

#S

#S

#S

#S #S

#S

#S

#S

#S

#S

#S #S

#S #S #S

#S

#S

#S

#S #S

#S

#S

#S

#S

#S #S #S

#S #S

#S #S

#S

#S#S

#S #S

#S

#S

#S #S

#S

#S #S

#S

#S #S

#S

#S

#S

#S

#S #S #S #S #S #S #S #S #S

#S #S

#S

#S #S

#S

#S

#S #S

#S

#S #S

#S

#S #S

#S #S #S

#S

#S #S

#S #S

#S

#S #S

#S #S

#S #S

#S

#S

#S

#S #S #S

#S

#S #S #S

#S

#S

#S

#S

#S

#S #S #S #S

#S

#S #S

#S

#S

#S

#S

#S #S

#S #S

#S

#S #S #S #S

#S #S #S

#S

#S#S

#S

#S

#S #S

#S

#S

#S #S #S #S

#S

#S

#S

#S

#S

#S

#S#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S #S

#S #S #S

#S #S

#S #S

#S #S #S

#S

#S

#S

#S #S #S #S

#S #S

#S

#S

#S #S

#S

#S

#S

#S #S #S #S

#S #S

#S

#S #S #S

#S

#S

#S #S #S

#S

#S

#S

#S

#S #S

#S

#S

#S

#S

#S #S

#S

#S #S

#S #S

#S #S #S #S

#S #S

#S

#S #S

#S

#S

#S

#S

#S

#S

#S #S #S

#S

#S

#S

#S #S

#S #S

#S

#S

#S

#S #S #S #S#S

#S

#S

#S

#S

#S#S

#S

#S #S

#S

#S

#S

#S

#S

#S #S

#S

#S #S

#S #S

#S

#S

#S #S #S

#S

#S

#S

#S

#S

#S

#S

#S

#S #S

#S

#S

#S

#S

#S

#S #S

#S

#S

#S

#S #S

#S #S #S #S

#S #S #S

#S

#S #S

#S

#S

#S

#S

#S

#S #S

#S

#S #S

#S

#S

#S

#S

#S

#S

#S #S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S

#S #S

#S

#S

#S

#S

#S

#S

#S

#S

#S #S

#S #S #S #S

#S

#S

#S#S

#S

#S

#S <= LAT #S > LAT and <= UAT #S > UAT and <= LV #S > LV and <= 50 % above LV #S > 50 % above LV

Nitrogen Dioxide

Yearly Average Urban Background Stations