-10°

-20°

-30°

-40°

-50°

0°

0°

10°

10°

20°

20° 30°

30°

40°

40°

50° 60° 70° 80° 90°

40° 40°

50°

50°

60°

60°

Natio n ally de sig n ated are as ( CDDA) , 20 0 3

Designations