") ")") ") ") ") ") ") ") ") ") ")")") ") ") ") ")") ")

") !(

-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

40°

40°

50°

50°

60°

60°

-10°

-30°

40°

50°

Lindane (mg/kg) in Mytilus (softbody) Wet weight based

Dry weight based (*0.2) ") ") ")

!( 0 - 0.01

!( 0.01 - 0.1

!(^{> 0.1}

0 - 0.01

0.01 - 0.1

> 0.1