-10°

-20°

-30°

0°

0°

10°

10° 20°

20°

30°

30°

40°

40°

50° 60° 70°

40°

40°

50°

50°

60°

Nu m b e r o f p la n t s p e cie s g a in e d

Outside data coverage

< 10 10 - 50 50 - 90 90 - 130 > 130