-20°

-30° -10°

0°

0°

10°

10° 20°

20°

30°

30°

40°

40°

50° 60° 70°

40°

40° 50°

50° 60°

30°

Sa lt w a te r in trus ion du e to grou n dw a t e r ove re xploita tion

No data

Salt water intrusion

Groundwater overexploitation

No groundwater overexploitation

Outside data coverage