-20°

-30° -10°

0°

0°

10°

10° 20°

20°

30°

30°

40° 50° 60°

40° 40°

50° 50°

60°

60°

Ozone - AOT4 0 Kriging In te rpola tion arou nd Ru ra l Sta tions (mg/ m^3)h

Rural stations (mg/ m^3)h

< 6 6-12 12-18 18-27

< 6 6-12 12-18 18-27 > 27

> 27