( ( ( (

( ( ( ( ( (

-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40°

40°

50° 60° 70° 80°

30° 30°

40° 40°

50°

50°

60°

-10°

-30°

60°

70°

Coastal zone

High Medium Low ( Degree of urbanisation

Risk zones of oil spills

Polluted water body