-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40°

40°

50° 60° 70°

40° 40°

50°

50°

60°

60°

-10°

-30°

50°

60°

PELCOM, 2000 Barren land Coniferous forest Data gaps Deciduous forest Grassland Inland waters Irrigated arable land Mixed forest Out of scope Permanent crops Permanent Ice&Snow Rainfed arable land Sea Shrubland Urban areas Wetlands