-10°

-20°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

20°

20°

30°

30°

40°

40°

-10°

50° 50°

Aridity index classification (Rainfall/PET)

0 - 0.05 0.05 - 0.2 0.2 - 0.5 0.5 - 0.65 > 0.65 Outside data coverage